
    EVENTS CONFIGURATION

    This window will display the host name, the test group, whether the
    test is turned on or off, whether logging for the test is turned on
    or off, the severity level, and the test name for each test
    Enlighten finds on your default host.

    From here you can:

    + Add Add an Events test
    + Modify Modify an existing Events test
    + Delete Delete the selected Events test(s)
    + Copy Copy the contents of an Events test and create a second test
    + Toggle State Turn the selected test on or off
    + Toggle Logging Turn logging for the selected test on or off

    The rest of this section describes how to use each of these options.

    Add

    Click on the Add button to select the test type for this new Event
    test. 

    Modify

    Click on the Modify button to modify an existing test configuration.
    A window similar to the Add Events Test window will appear, except
    you can not modify the Testname field.

    There are also two button differences in the Modify window:

    + you can use the Modify button (rather than the Add button) after
      you've made all your changes and

    + you can use the Next button to modify additional test
      configurations if you've selected more than one to modify from the
      Events Configuration list.

    Delete

    Click on this button to delete the selected tests from the Events
    Configuration list. Enlighten will prompt you to confirm your
    action.

    Note: You can only delete tests you have added. You can turn-off
    built-in tests, but you can't delete them from the Configure Events
    list.

    Copy

    Click on this button to copy the contents of an Events test and
    create a second test. The Add Events Test window will appear showing
    the highlighted job's settings in each field. You can edit this
    window as needed and then click on the Apply button to complete the
    copy.

    See "Add Test" on page 10-4 for a description of how to use this
    window's fields and buttons.

    Note: You can only copy tests you have added.

    Toggle State

    Click on this button to toggle the highlighted test(s) on or off.
    Those which were turned off will be turned on and vice-versa.

    Toggle Logging

    Click on this button to toggle the logging for the highlighted
    test(s) on or off. Those which were turned off will be turned on and
    vice-versa.

